From 124af9f4b2b77b1510d88cfc8092c788d7e513c7 Mon Sep 17 00:00:00 2001
From: Eric Andersen <andersen@codepoet.org>
Date: Fri, 20 May 2005 19:02:51 +0000
Subject: Back out nptl changes, which for now will be done in
 branches/uClibc-nptl

---
 libpthread/nptl_db/structs.def | 86 ------------------------------------------
 1 file changed, 86 deletions(-)
 delete mode 100644 libpthread/nptl_db/structs.def

(limited to 'libpthread/nptl_db/structs.def')

diff --git a/libpthread/nptl_db/structs.def b/libpthread/nptl_db/structs.def
deleted file mode 100644
index b17a628e0..000000000
--- a/libpthread/nptl_db/structs.def
+++ /dev/null
@@ -1,86 +0,0 @@
-/* List of types and symbols in libpthread examined by libthread_db.
-   Copyright (C) 2003 Free Software Foundation, Inc.
-   This file is part of the GNU C Library.
-
-   The GNU C Library is free software; you can redistribute it and/or
-   modify it under the terms of the GNU Lesser General Public
-   License as published by the Free Software Foundation; either
-   version 2.1 of the License, or (at your option) any later version.
-
-   The GNU C Library is distributed in the hope that it will be useful,
-   but WITHOUT ANY WARRANTY; without even the implied warranty of
-   MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the GNU
-   Lesser General Public License for more details.
-
-   You should have received a copy of the GNU Lesser General Public
-   License along with the GNU C Library; if not, write to the Free
-   Software Foundation, Inc., 59 Temple Place, Suite 330, Boston, MA
-   02111-1307 USA.  */
-
-#ifndef DB_STRUCT_ARRAY_FIELD
-# define DB_STRUCT_ARRAY_FIELD(type, field) DB_STRUCT_FIELD (type, field)
-# define DB_ARRAY_VARIABLE(name) DB_VARIABLE (name)
-# define STRUCTS_DEF_DEFAULTS 1
-#endif
-
-DB_STRUCT (pthread)
-DB_STRUCT_FIELD (pthread, list)
-DB_STRUCT_FIELD (pthread, report_events)
-DB_STRUCT_FIELD (pthread, tid)
-DB_STRUCT_FIELD (pthread, start_routine)
-DB_STRUCT_FIELD (pthread, cancelhandling)
-DB_STRUCT_FIELD (pthread, schedpolicy)
-DB_STRUCT_FIELD (pthread, schedparam_sched_priority)
-DB_STRUCT_FIELD (pthread, specific)
-DB_STRUCT_FIELD (pthread, eventbuf)
-DB_STRUCT_FIELD (pthread, eventbuf_eventmask)
-DB_STRUCT_ARRAY_FIELD (pthread, eventbuf_eventmask_event_bits)
-DB_STRUCT_FIELD (pthread, nextevent)
-
-DB_STRUCT (list_t)
-DB_STRUCT_FIELD (list_t, next)
-DB_STRUCT_FIELD (list_t, prev)
-
-DB_STRUCT (td_thr_events_t)
-DB_STRUCT_ARRAY_FIELD (td_thr_events_t, event_bits)
-
-DB_STRUCT (td_eventbuf_t)
-DB_STRUCT_FIELD (td_eventbuf_t, eventnum)
-DB_STRUCT_FIELD (td_eventbuf_t, eventdata)
-
-DB_SYMBOL (stack_used)
-DB_SYMBOL (__stack_user)
-DB_SYMBOL (nptl_version)
-DB_FUNCTION (__nptl_create_event)
-DB_FUNCTION (__nptl_death_event)
-DB_SYMBOL (__nptl_threads_events)
-DB_VARIABLE (__nptl_nthreads)
-DB_VARIABLE (__nptl_last_event)
-
-DB_ARRAY_VARIABLE (__pthread_keys)
-DB_STRUCT (pthread_key_struct)
-DB_STRUCT_FIELD (pthread_key_struct, seq)
-DB_STRUCT_FIELD (pthread_key_struct, destr)
-
-DB_STRUCT (pthread_key_data)
-DB_STRUCT_FIELD (pthread_key_data, seq)
-DB_STRUCT_FIELD (pthread_key_data, data)
-DB_STRUCT (pthread_key_data_level2)
-DB_STRUCT_ARRAY_FIELD (pthread_key_data_level2, data)
-
-#if USE_TLS
-DB_STRUCT_FIELD (link_map, l_tls_modid)
-#endif
-
-#if !defined IS_IN_libpthread || USE_TLS
-DB_STRUCT_ARRAY_FIELD (dtv, dtv)
-#endif
-#if !defined IS_IN_libpthread || TLS_TCB_AT_TP
-DB_STRUCT_FIELD (pthread, dtvp)
-#endif
-
-#ifdef STRUCTS_DEF_DEFAULTS
-# undef DB_STRUCT_ARRAY_FIELD
-# undef DB_ARRAY_VARIABLE
-# undef STRUCTS_DEF_DEFAULTS
-#endif
-- 
cgit v1.2.3

